06/18 06/19 06/20 06/21 06/22 06/23 06/24 0 5 10 15 20 25

Chl (mg m -3)

MBARI M0/CIMT Mooring Fluorescence (1279)

06/18 06/19 06/20 06/21 06/22 06/23 06/24 0 0.005

0.01

0.015

0.02

0.025

0.03

Bb(λ) (m -1)

MBARI M0/CIMT Mooring Scattering Meter (1301)

0 10 20 30 40 50

0 5 10 15 20 25 30 35 40 45 50 -8

-6

-4

-2

0

2

4

6

8

10