1990 1991 1992 1993 1994 1995 1996 1997 1998 1999 2000 18

20

22

24

26

28

30

SST (°C) mean min

0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5

Satellite Chlorophyll (mg m -3)

1990 1991 1992 1993 1994 1995 1996 1997 1998 1999 2000 0 0.1 0.2 0.3 0.4 0.5 0.6

Year

% pixels < 25°C

Averaged between 2°N and 2°S, 180° and 100°W

Pathfinder SST & OCTS/SeaWiFS Chl