0.1

0.15

0.2

0.25

0.3

0.35

0.4

0.45

OCTS SeaWiFS

CZCS mean

Mean chlorophyll (mg m -3)

ND J FMAMJ J ASONDJ FMAMJ J ASONDJ FMAMJ J ASONDJ F 1997 1998 1999