0

50

100 Geostrophic Fluxes -- INTERANNUAL

Depth (m)

0 2 4 6 8 10 12

150 200 250 300 350 400 450 500

non-ENSO

ENSO

1984-87

1988-92

1993-97

Volume

(10_4 m_3 s_{- 1})

0

50

100

150

0 10 20 30 40

200 250 300 350 400 450 500 Heat

(W m_{- 2}) 0

50

100

150

-0.2 0 0.2 0.4 0.6 0.8 1

200 250 300 350 400 450 500 Nitrate

(kmol s_{- 1})

0

50

100

150

0 0.1 0.2 0.3

200 250 300 350 400 450 500 Chlorophyll

(kg s_{- 1})