126^oW 124^oW 122^oW 120^oW 118^oW

30^oN

32^oN

34^oN

36^oN

Box Model Stations

Pt. Conception

San Diego

77.100 .90 .80 .70 .60 .55 .51

80.100

83.100

87.100

90.100

93.100 .90 .80 .70 .60 .55 .50 .45 .40 .35 .30 .29

128^oW 120^oW 112^oW

30^oN

36^oN

42^oN

PACIFIC OCEAN