690 700 710 720 730 740 750 760 770 780 0

0.001

0.002

0.003

0.004

0.005

0.006

0.007

0.008

0.009

0.01

0 1

Fl_{700nm}. Dorado AUV mission 2011.256.02

Time (seconds)